%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Mahindawansha_etal2020} Mahindawansha, A., K{\"u}lls, C., Kraft, P., \& Breuer, L. (2020). Investigating unproductive water losses from irrigated agricultural crops in the humid tropics through analyses of stable isotopes of water. \textit{Hydrology and Earth System Sciences}, \textit{24}(7), 3627--3642.

\end{thebibliography}

\end{document}

